References

[1] Paul S. Amerins, Ricardo A. Baeza-Yates, and Derick Wood. On efficient entreeings. Acta Inf., 30:203–213, 1993.

[2] James H. Anderson. A fine-grained solution to the mutual exclusion problem. Acta Inf., 30:249–265, 1993.

[3] Walid G. Aref and Hanan Samet. Decomposing a window into maximal quadtree blocks. Acta Inf., 30:425–439, 1993.

[4] Eddy Bevers and Johan Lewi. Proving termination of (conditional) rewrite systems. a semantic approach. Acta Inf., 30:537–568, 1993.

[5] John Buckle. A characterisation of meet and join respecting pre-orders and congruences on finite lattices. Acta Inf., 30:773–785, 1993.

[6] Julien Cassaigne. Unavoidable binary patterns. Acta Inf., 30:385–395, 1993.

[7] Jr. Coffman, E.G., Leopold Flatto, and A.Y. Kreinin. Scheduling saves in fault-tolerant computations. Acta Inf., 30:409–423, 1993.

[8] Karel Culik II and Simant Dube. L-systems and mutually recursive function systems. Acta Inf., 30:279–302, 1993.

[9] Luc Devroye. On the expected height of fringe-balanced trees. Acta Inf., 30:459–466, 1993.

[10] Yuzheng Ding and Mark Allen Weiss. The relaxed min-max heap. a mergeable double-ended priority queue. Acta Inf., 30:215–231, 1993.

[11] Anna Hać. Performance and reliability improvement by using asynchronous algorithms in disk buffer cache memory. Acta Inf., 30:131–146, 1993.

[12] Héctor J. Hernández. Extended nested relations. Acta Inf., 30:741–771, 1993.

[13] C.A.R. Hoare, He Jifeng, and A. Sampaio. Normal form approach to compiler design. Acta Inf., 30:701–739, 1993.

[14] Shigeki Iwata, Takumi Kasai, and Etsuro Moriya. Relations among simultaneous complexity classes of nondeterministic and alternating turing machines. Acta Inf., 30:267–278, 1993.

[15] Jan KratochvIl and Mirko Křivánek. Satisfiability of co-nested formulas.

Acta Inf., 30:397–403, 1993.

[16] K. Narayan Kumar and Paritosh K. Pandya. Infinitary parallelism without unbounded nondeterminism in csp. Acta Inf., 30:467–487, 1993.

[17] Thomas Lehmann and Jacques Loeckx. Obscure: A specification language for abstract data types. Acta Inf., 30:303–350, 1993.

[18] Zohar Manna and Amir Pnueli. Models for reactivity. Acta Inf., 30:609– 678, 1993.

[19] Kim Marriott. Frameworks for abstract interpretation. Acta Inf., 30:103–129, 1993.

[20] Alexandru Mateescu and Arto Salomaa. On simplest possible solutions for post correspondence problems. Acta Inf., 30:441–457, 1993.

[21] Marisa Navarro, Fernando Orejas, and Jean-Luc Remy. Contextual rewriting as a sound and complete proof method for conditional logspecifications. Acta Inf., 30:147–180, 1993.

[22] Xavier Nicollin, Joseph Sifakis, and Sergio Yovine. From atp to timed graphs and hybrid systems. Acta Inf., 30:181–202, 1993.

[23] Gheorghe Păun. On the synchronization in parallel communicating grammar systems. Acta Inf., 30:351–367, 1993.

[24] Antoine Petit. Recognizable trace languages, distributed automata and the distribution problem. Acta Inf., 30:89–101, 1993.

[25] Patricio V. Poblete. The analysis of heuristics for search trees. Acta Inf., 30:233–248, 1993.

[26] Zhenyu Qian. An algebraic semantics of higher-order types with subtypes. Acta Inf., 30:569–607, 1993.

[27] Ambuj K. Singh. Program refinement in fair transition systems. Acta Inf., 30:503–535, 1993.

[28] David Spuler. The optimal binary search tree for andersson’s search algorithm. Acta Inf., 30:405–407, 1993.

[29] Iain A. Stewart. Logical and schematic characterization of complexity classes. Acta Inf., 30:61–87, 1993.

[30] Bent Thomsen. Plain chocs: A second generation calculus for higher order processes. Acta Inf., 30:1–59, 1993.

[31] Alexander Tuzhilin. Querying datalog programs with temporal logic.

Acta Inf., 30:679–700, 1993.

[32] Jan Van den Bussche. On minimizing the ∀ − ¬ degree of a connectivefree formula. Acta Inf., 30:489–502, 1993.

[33] Daniel M. Yellin. Speeding up dynamic transitive closure for bounded degree graphs. Acta Inf., 30:369–384, 1993.